-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.46


######### Lightcurve features #########

amplitude  =  0.202125858277
cusum  =  0.162196853803
eta  =  0.832285005961
hl_amp_ratio  =  0.812985461694
kurtosis  =  -0.713969889481
n_points  =  271
period  =  1.07859020168
period_SNR  =  11.8691121654
period_log10FAP  =  -4.88614086903
period_uncertainty  =  0.000388447902129
phase_cusum  =  0.164655085156
phase_eta  =  1.35558700963
phi21  =  1.60550793309
phi31  =  1.77967704859
quartile31  =  0.6
r21  =  0.126179162169
r31  =  0.272627864408
shapiro_w  =  0.961945712566
skewness  =  -0.303580143368
slope_per10  =  -0.10436591897
slope_per90  =  0.11034615902
stetson_k  =  0.835225499208
weighted_mean  =  14.6928354747
weighted_std  =  0.360332259112
