-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.26478172795
cusum  =  0.129979915451
eta  =  0.542198519206
hl_amp_ratio  =  0.440883355003
kurtosis  =  -0.0942224523215
n_points  =  334
period  =  0.600980590635
period_SNR  =  42.2605437082
period_log10FAP  =  -43.7611502392
period_uncertainty  =  0.000100505151978
phase_cusum  =  0.283816306233
phase_eta  =  0.51625338236
phi21  =  0.786431194344
phi31  =  1.36599231092
quartile31  =  0.29
r21  =  0.340448227853
r31  =  0.16243183916
shapiro_w  =  0.913448870182
skewness  =  -0.875781804361
slope_per10  =  -0.0933945219851
slope_per90  =  0.150480250338
stetson_k  =  0.758219550779
weighted_mean  =  13.3638582282
weighted_std  =  0.197176386025
