-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.86


######### Lightcurve features #########

amplitude  =  0.366462652707
cusum  =  0.167284657224
eta  =  0.654779779329
hl_amp_ratio  =  0.482332240383
kurtosis  =  -1.18504460943
n_points  =  231
period  =  0.611103179402
period_SNR  =  25.7220152893
period_log10FAP  =  -25.3515514524
period_uncertainty  =  0.000101518904178
phase_cusum  =  0.253362251107
phase_eta  =  0.128108582919
phi21  =  0.953303046309
phi31  =  -0.982656745452
quartile31  =  0.59
r21  =  0.540906288002
r31  =  0.255651589161
shapiro_w  =  0.933241188526
skewness  =  -0.338166138981
slope_per10  =  -0.227080692969
slope_per90  =  0.183104939031
stetson_k  =  0.804259944263
weighted_mean  =  16.0015072601
weighted_std  =  0.335328753619
