-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.291184601562
cusum  =  0.232017069364
eta  =  0.995701999438
hl_amp_ratio  =  0.535933605636
kurtosis  =  -0.588716121558
n_points  =  103
period  =  0.548830563616
period_SNR  =  20.2120123266
period_log10FAP  =  -11.4306024286
period_uncertainty  =  0.000109372376354
phase_cusum  =  0.293655848671
phase_eta  =  0.312152576824
phi21  =  -4.67340468955
phi31  =  -5.95991086949
quartile31  =  0.245
r21  =  0.569253765105
r31  =  0.194154736402
shapiro_w  =  0.955894231796
skewness  =  -0.521509574709
slope_per10  =  -0.312750581094
slope_per90  =  0.189861408747
stetson_k  =  0.789680831163
weighted_mean  =  15.7254735889
weighted_std  =  0.171868327944
