-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.61


######### Lightcurve features #########

amplitude  =  0.31277425212
cusum  =  0.197010899854
eta  =  0.525763335856
hl_amp_ratio  =  0.683736270755
kurtosis  =  -1.01571946204
n_points  =  113
period  =  0.660883088668
period_SNR  =  12.2765495141
period_log10FAP  =  -10.3850173807
period_uncertainty  =  0.000128068194809
phase_cusum  =  0.248567522242
phase_eta  =  0.223827558752
phi21  =  -2.07635202601
phi31  =  -0.812568694243
quartile31  =  0.5
r21  =  0.282618898346
r31  =  0.266065293214
shapiro_w  =  0.921764731407
skewness  =  -0.464113824291
slope_per10  =  -0.432799980044
slope_per90  =  0.251099998131
stetson_k  =  0.856972429892
weighted_mean  =  12.5863017751
weighted_std  =  0.269674234875
