-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.166859049617
cusum  =  0.122234696357
eta  =  0.834871410691
hl_amp_ratio  =  1.06514283342
kurtosis  =  -0.153159792449
n_points  =  201
period  =  0.143329503599
period_SNR  =  11.821815245
period_log10FAP  =  -6.11544065065
period_uncertainty  =  4.64721820083e-06
phase_cusum  =  0.202110823973
phase_eta  =  1.45459975256
phi21  =  3.58735217386
phi31  =  3.13336034717
quartile31  =  0.33
r21  =  0.072197331369
r31  =  0.111070384847
shapiro_w  =  0.988796412945
skewness  =  -0.237684068092
slope_per10  =  -0.0121015642085
slope_per90  =  0.0227684372029
stetson_k  =  0.804370691133
weighted_mean  =  10.9751741294
weighted_std  =  0.23125892647
