-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.338362342684
cusum  =  0.119611835169
eta  =  0.553538554073
hl_amp_ratio  =  0.484688758914
kurtosis  =  -0.196014091327
n_points  =  308
period  =  0.655172428046
period_SNR  =  36.8448967862
period_log10FAP  =  -35.9966099201
period_uncertainty  =  0.000141781531861
phase_cusum  =  0.245521570867
phase_eta  =  0.323742601846
phi21  =  4.27721973512
phi31  =  2.72082554834
quartile31  =  0.4225
r21  =  0.44774615931
r31  =  0.238209812203
shapiro_w  =  0.943613111973
skewness  =  -0.714654562816
slope_per10  =  -0.0903552454466
slope_per90  =  0.17862388168
stetson_k  =  0.770167095225
weighted_mean  =  12.5589728835
weighted_std  =  0.293229222092
