<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.84


######### Lightcurve features #########

amplitude  =  0.167709890573
cusum  =  0.131106561615
eta  =  0.647959264912
hl_amp_ratio  =  0.654530658259
kurtosis  =  -0.856777109884
n_points  =  200
period  =  0.757337551877
period_SNR  =  23.2507081236
period_log10FAP  =  -21.475499593
period_uncertainty  =  0.000187089327593
phase_cusum  =  0.258395197796
phase_eta  =  0.460424312414
phi21  =  -1.95531739945
phi31  =  -3.80760708213
quartile31  =  0.26
r21  =  0.411471412979
r31  =  0.320885624051
shapiro_w  =  0.955220758915
skewness  =  -0.349631323282
slope_per10  =  -0.393584181835
slope_per90  =  0.376399995293
stetson_k  =  0.843116294728
weighted_mean  =  12.987998325
weighted_std  =  0.15696694911
</pre></body></html>