-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.305242365755
cusum  =  0.195211072638
eta  =  0.413463064852
hl_amp_ratio  =  0.402461225582
kurtosis  =  0.645919533187
n_points  =  275
period  =  0.556020943795
period_SNR  =  34.1119630188
period_log10FAP  =  -34.2949967285
period_uncertainty  =  0.000103709455945
phase_cusum  =  0.269564990073
phase_eta  =  0.163034675731
phi21  =  -2.30278418524
phi31  =  -4.46739472101
quartile31  =  0.3
r21  =  0.480095447587
r31  =  0.290451169432
shapiro_w  =  0.880274713039
skewness  =  -1.11797513138
slope_per10  =  -0.132701293166
slope_per90  =  0.349323580312
stetson_k  =  0.750094314945
weighted_mean  =  13.502892562
weighted_std  =  0.226289955979
