-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.221013611913
cusum  =  0.0967186838471
eta  =  0.704352718452
hl_amp_ratio  =  0.744774674765
kurtosis  =  -0.9948656178
n_points  =  364
period  =  0.795267203457
period_SNR  =  45.364682677
period_log10FAP  =  -46.7755142255
period_uncertainty  =  0.000175354392435
phase_cusum  =  0.234485725245
phase_eta  =  0.340909804381
phi21  =  -1.66971198316
phi31  =  -3.35200726839
quartile31  =  0.3425
r21  =  0.387421406405
r31  =  0.218846721679
shapiro_w  =  0.967860639095
skewness  =  -0.171370234351
slope_per10  =  -0.113976460313
slope_per90  =  0.134748504453
stetson_k  =  0.855493253148
weighted_mean  =  17.0785712232
weighted_std  =  0.198101898809
