-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.72


######### Lightcurve features #########

amplitude  =  0.0541848720255
cusum  =  0.148244073938
eta  =  1.32625757639
hl_amp_ratio  =  1.78000330095
kurtosis  =  1.91714495851
n_points  =  109
period  =  0.954195858628
period_SNR  =  10.5203512698
period_log10FAP  =  -0.426534511199
period_uncertainty  =  0.000396645145585
phase_cusum  =  0.113665076432
phase_eta  =  1.48962664102
phi21  =  -1.56613091382
phi31  =  -3.23940916067
quartile31  =  0.07
r21  =  0.0467360085138
r31  =  0.476396167728
shapiro_w  =  0.933226943016
skewness  =  1.03437134648
slope_per10  =  -0.589954179406
slope_per90  =  0.457095880785
stetson_k  =  0.69592744927
weighted_mean  =  14.9594066255
weighted_std  =  0.0619437573976
