-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.251875446192
cusum  =  0.148935112528
eta  =  0.515509261823
hl_amp_ratio  =  0.57184804015
kurtosis  =  -1.05674992117
n_points  =  349
period  =  0.720501971933
period_SNR  =  42.7538316071
period_log10FAP  =  -44.7165706698
period_uncertainty  =  0.000144458657417
phase_cusum  =  0.308021718704
phase_eta  =  0.170286397551
phi21  =  1.17308974486
phi31  =  -0.746388557602
quartile31  =  0.35
r21  =  0.533897133544
r31  =  0.338338854304
shapiro_w  =  0.941369533539
skewness  =  -0.369766879633
slope_per10  =  -0.19014410263
slope_per90  =  0.166954852633
stetson_k  =  0.795292125883
weighted_mean  =  16.8323584743
weighted_std  =  0.215713914339
