-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_EC
class_probability =  0.23


######### Lightcurve features #########

amplitude  =  0.185932772355
cusum  =  0.171258956172
eta  =  0.741244295001
hl_amp_ratio  =  0.708568578818
kurtosis  =  0.252147153987
n_points  =  151
period  =  30.1513435336
period_SNR  =  12.4419920515
period_log10FAP  =  -8.02758586126
period_uncertainty  =  0.265436572058
phase_cusum  =  0.239546539737
phase_eta  =  0.591364339075
phi21  =  3.37621980987
phi31  =  2.3874639781
quartile31  =  0.31
r21  =  0.327377660362
r31  =  0.0861118241199
shapiro_w  =  0.953712999821
skewness  =  -0.755292578431
slope_per10  =  -3.19684923452
slope_per90  =  1.64399999194
stetson_k  =  0.776324199356
weighted_mean  =  11.2535761589
weighted_std  =  0.233502965566
