-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.37


######### Lightcurve features #########

amplitude  =  0.426697060496
cusum  =  0.283291900907
eta  =  0.439995166969
hl_amp_ratio  =  0.35640018868
kurtosis  =  -1.27321495731
n_points  =  80
period  =  0.206409778225
period_SNR  =  8.91571531824
period_log10FAP  =  -6.06203447768
period_uncertainty  =  1.3656859805e-05
phase_cusum  =  0.333435189799
phase_eta  =  0.368794923968
phi21  =  0.153367754974
phi31  =  -2.21699532744
quartile31  =  0.6
r21  =  0.154647007301
r31  =  0.269805483961
shapiro_w  =  0.878898561001
skewness  =  -0.478184059828
slope_per10  =  -0.0469963047105
slope_per90  =  0.289200002638
stetson_k  =  0.759838347936
weighted_mean  =  14.769324437
weighted_std  =  0.341687604903
