-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.362379483046
cusum  =  0.228625399636
eta  =  0.515658863045
hl_amp_ratio  =  0.222674931855
kurtosis  =  -0.130151123728
n_points  =  125
period  =  0.460090546591
period_SNR  =  14.7764342617
period_log10FAP  =  -8.48426304744
period_uncertainty  =  0.000111672467698
phase_cusum  =  0.239872022073
phase_eta  =  0.607131339676
phi21  =  0.489287613507
phi31  =  -2.60299299443
quartile31  =  0.42
r21  =  0.465204786821
r31  =  0.0970744549588
shapiro_w  =  0.840558409691
skewness  =  -1.07055264277
slope_per10  =  -0.168394256105
slope_per90  =  0.200686581742
stetson_k  =  0.630024583507
weighted_mean  =  15.7075960684
weighted_std  =  0.380212277679
