-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.408664038595
cusum  =  0.171006476591
eta  =  0.593746592444
hl_amp_ratio  =  0.215950525787
kurtosis  =  0.00659804003349
n_points  =  144
period  =  0.505106748978
period_SNR  =  16.223362692
period_log10FAP  =  -14.7360211681
period_uncertainty  =  0.000119615598894
phase_cusum  =  0.263995336529
phase_eta  =  0.128956839734
phi21  =  0.69751134663
phi31  =  1.69893991161
quartile31  =  0.4325
r21  =  0.465586120037
r31  =  0.301176100101
shapiro_w  =  0.835698246956
skewness  =  -1.07348672698
slope_per10  =  -0.183437638878
slope_per90  =  0.342680857394
stetson_k  =  0.684370145384
weighted_mean  =  13.9407645631
weighted_std  =  0.331761294035
