-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.148049991482
cusum  =  0.0979682775494
eta  =  0.832461112551
hl_amp_ratio  =  0.884395833506
kurtosis  =  -0.478162539105
n_points  =  548
period  =  0.632513218179
period_SNR  =  63.432055838
period_log10FAP  =  -63.9989615684
period_uncertainty  =  0.000103860958054
phase_cusum  =  0.204502466143
phase_eta  =  0.682704904718
phi21  =  4.43203943685
phi31  =  5.91647197107
quartile31  =  0.2
r21  =  0.348970077376
r31  =  0.155385697071
shapiro_w  =  0.989136457443
skewness  =  -0.026017177816
slope_per10  =  -0.0859972256025
slope_per90  =  0.108007939094
stetson_k  =  0.825869361358
weighted_mean  =  15.8718730033
weighted_std  =  0.136455660163
