-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.364173171552
cusum  =  0.117503734506
eta  =  0.659990797572
hl_amp_ratio  =  0.482181131242
kurtosis  =  -0.379168936019
n_points  =  180
period  =  0.557768032133
period_SNR  =  20.1357596222
period_log10FAP  =  -18.190001983
period_uncertainty  =  0.000102612629732
phase_cusum  =  0.252857326601
phase_eta  =  0.0677439810487
phi21  =  0.788943927403
phi31  =  -1.15891271075
quartile31  =  0.3525
r21  =  0.573533416618
r31  =  0.344876682933
shapiro_w  =  0.894758522511
skewness  =  -0.838054967771
slope_per10  =  -0.185497794843
slope_per90  =  0.49755308937
stetson_k  =  0.752938676292
weighted_mean  =  13.9078986867
weighted_std  =  0.295156480675
