<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.41


######### Lightcurve features #########

amplitude  =  0.173045355373
cusum  =  0.264116101562
eta  =  0.415460103696
hl_amp_ratio  =  1.02181410377
kurtosis  =  -0.821616113851
n_points  =  86
period  =  0.663715309248
period_SNR  =  10.358531473
period_log10FAP  =  -7.34715806222
period_uncertainty  =  0.000112313280016
phase_cusum  =  0.365952650207
phase_eta  =  0.394963402087
phi21  =  1.21253370416
phi31  =  -0.772443086765
quartile31  =  0.23
r21  =  0.258383979567
r31  =  0.274458841842
shapiro_w  =  0.962112188339
skewness  =  -0.210867484346
slope_per10  =  -0.526399994269
slope_per90  =  0.615899995901
stetson_k  =  0.836435490181
weighted_mean  =  13.510859375
weighted_std  =  0.153030722731
</pre></body></html>