-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.249465474931
cusum  =  0.117925711183
eta  =  0.462199625903
hl_amp_ratio  =  0.435086407226
kurtosis  =  -1.13200484171
n_points  =  222
period  =  0.570605241531
period_SNR  =  32.1108286593
period_log10FAP  =  -33.3943209347
period_uncertainty  =  0.00010739120359
phase_cusum  =  0.248551701583
phase_eta  =  0.0729793831498
phi21  =  -2.19716558899
phi31  =  -1.04186824327
quartile31  =  0.36
r21  =  0.456326593287
r31  =  0.250791429878
shapiro_w  =  0.876010000706
skewness  =  -0.570906582176
slope_per10  =  -0.255379332873
slope_per90  =  0.372399995103
stetson_k  =  0.791537461703
weighted_mean  =  14.8726016688
weighted_std  =  0.219376744947
