-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.75


######### Lightcurve features #########

amplitude  =  0.446076412177
cusum  =  0.142360565508
eta  =  0.588179737299
hl_amp_ratio  =  0.959588510545
kurtosis  =  -1.21252312647
n_points  =  270
period  =  0.631811700912
period_SNR  =  39.7009020902
period_log10FAP  =  -36.4622890564
period_uncertainty  =  0.000159998631944
phase_cusum  =  0.265754465098
phase_eta  =  0.0313395620636
phi21  =  -2.08044538682
phi31  =  -3.57427789222
quartile31  =  0.75
r21  =  0.515888820265
r31  =  0.330732350505
shapiro_w  =  0.946398556232
skewness  =  -0.0382241130918
slope_per10  =  -0.143103897729
slope_per90  =  0.326268448866
stetson_k  =  0.871935581702
weighted_mean  =  12.3028350515
weighted_std  =  0.385032738745
