-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.285790699466
cusum  =  0.167583876754
eta  =  0.565027830565
hl_amp_ratio  =  0.467165481611
kurtosis  =  -1.03764963216
n_points  =  149
period  =  0.630989014647
period_SNR  =  15.3210869392
period_log10FAP  =  -14.2768385227
period_uncertainty  =  0.000116702862204
phase_cusum  =  0.237802597915
phase_eta  =  0.376042932017
phi21  =  0.725571685562
phi31  =  1.96342848249
quartile31  =  0.51
r21  =  0.433866782286
r31  =  0.314608592636
shapiro_w  =  0.934214472771
skewness  =  -0.423127226257
slope_per10  =  -0.147298662543
slope_per90  =  0.428200000897
stetson_k  =  0.81323131514
weighted_mean  =  13.3098092031
weighted_std  =  0.305410741744
