-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.4


######### Lightcurve features #########

amplitude  =  0.12077706936
cusum  =  0.198509688977
eta  =  0.81662979401
hl_amp_ratio  =  1.67248020929
kurtosis  =  -1.41424451363
n_points  =  199
period  =  1.53050974484
period_SNR  =  14.2468174298
period_log10FAP  =  -8.10385524341
period_uncertainty  =  0.000968852570123
phase_cusum  =  0.194854696983
phase_eta  =  0.968039130783
phi21  =  -2.69389339087
phi31  =  -2.60876506827
quartile31  =  0.29
r21  =  0.0906411089957
r31  =  0.0954235829507
shapiro_w  =  0.922749936581
skewness  =  0.1256802407
slope_per10  =  -0.391069754884
slope_per90  =  0.509173040671
stetson_k  =  0.864465307919
weighted_mean  =  15.7697982147
weighted_std  =  0.149506779075
