-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.8


######### Lightcurve features #########

amplitude  =  0.155155036257
cusum  =  0.280132226559
eta  =  0.645784558674
hl_amp_ratio  =  0.616111905839
kurtosis  =  -0.500703283789
n_points  =  87
period  =  0.119659988496
period_SNR  =  8.96332061399
period_log10FAP  =  -4.93270899203
period_uncertainty  =  5.03605350755e-06
phase_cusum  =  0.276394885556
phase_eta  =  0.975992771837
phi21  =  0.727838680241
phi31  =  2.84766419181
quartile31  =  0.2
r21  =  0.173738618613
r31  =  0.335077030861
shapiro_w  =  0.961360514164
skewness  =  -0.471714719534
slope_per10  =  -0.0418838935522
slope_per90  =  0.0872400030494
stetson_k  =  0.78824160886
weighted_mean  =  10.9198850575
weighted_std  =  0.156957379476
