-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_Other
class_probability =  0.72


######### Lightcurve features #########

amplitude  =  0.217851460314
cusum  =  0.279212043338
eta  =  0.359138691893
hl_amp_ratio  =  0.69824325901
kurtosis  =  -0.64766081914
n_points  =  212
period  =  0.572012476955
period_SNR  =  26.3046177902
period_log10FAP  =  -26.564293982
period_uncertainty  =  9.48296571698e-05
phase_cusum  =  0.254702314506
phase_eta  =  0.376144096786
phi21  =  0.689091622732
phi31  =  3.63549437856
quartile31  =  0.265
r21  =  0.161239204164
r31  =  0.183306700902
shapiro_w  =  0.951041579247
skewness  =  -0.498594761545
slope_per10  =  -0.255674991058
slope_per90  =  0.436734963218
stetson_k  =  0.823171174515
weighted_mean  =  13.1643138801
weighted_std  =  0.175090114418
