-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.31


######### Lightcurve features #########

amplitude  =  0.166550732351
cusum  =  0.0945506224406
eta  =  0.628789301496
hl_amp_ratio  =  0.797252082877
kurtosis  =  -0.304432571832
n_points  =  363
period  =  0.380548905972
period_SNR  =  39.3888752944
period_log10FAP  =  -40.8752381044
period_uncertainty  =  4.02970170346e-05
phase_cusum  =  0.204708068942
phase_eta  =  0.560317191711
phi21  =  2.39805849046
phi31  =  1.87723190388
quartile31  =  0.2
r21  =  0.136694495932
r31  =  0.175787207743
shapiro_w  =  0.970191955566
skewness  =  -0.497562005604
slope_per10  =  -0.0671458293582
slope_per90  =  0.0643147454727
stetson_k  =  0.806225548399
weighted_mean  =  16.3394277512
weighted_std  =  0.148716232765
