-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.317227535556
cusum  =  0.189805342997
eta  =  0.562598113193
hl_amp_ratio  =  0.712311267307
kurtosis  =  -1.2460891699
n_points  =  225
period  =  0.55247605114
period_SNR  =  36.3425258496
period_log10FAP  =  -30.5024972318
period_uncertainty  =  0.000121790405683
phase_cusum  =  0.297684027304
phase_eta  =  0.275643718031
phi21  =  -1.88889967963
phi31  =  -0.461939878644
quartile31  =  0.46
r21  =  0.493684440857
r31  =  0.224834083832
shapiro_w  =  0.940356969833
skewness  =  -0.183053471404
slope_per10  =  -0.132115540333
slope_per90  =  0.365845522882
stetson_k  =  0.872393708295
weighted_mean  =  12.0399741686
weighted_std  =  0.263040515014
