-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.29408127729
cusum  =  0.121532523019
eta  =  0.588286252321
hl_amp_ratio  =  0.321338023354
kurtosis  =  0.176535421298
n_points  =  363
period  =  0.669604983604
period_SNR  =  37.0272088561
period_log10FAP  =  -37.5022181462
period_uncertainty  =  0.000124768019289
phase_cusum  =  0.22124280199
phase_eta  =  0.362331709292
phi21  =  -2.31700208973
phi31  =  -1.28158597168
quartile31  =  0.255
r21  =  0.541588269062
r31  =  0.358699889218
shapiro_w  =  0.8739554286
skewness  =  -0.915052844424
slope_per10  =  -0.104040391064
slope_per90  =  0.215117743463
stetson_k  =  0.655937544921
weighted_mean  =  15.5929983762
weighted_std  =  0.262198862139
