-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.254854437534
cusum  =  0.221741770977
eta  =  0.701233710574
hl_amp_ratio  =  0.60287184671
kurtosis  =  -0.0143917880808
n_points  =  120
period  =  0.632554595417
period_SNR  =  18.1481682378
period_log10FAP  =  -11.6369806688
period_uncertainty  =  0.00017741335252
phase_cusum  =  0.27486664419
phase_eta  =  0.220943053108
phi21  =  0.650130681347
phi31  =  1.68825475184
quartile31  =  0.37
r21  =  0.390790890226
r31  =  0.448486969467
shapiro_w  =  0.916563928127
skewness  =  -0.750598036675
slope_per10  =  -0.263291352426
slope_per90  =  0.406077077824
stetson_k  =  0.828915443709
weighted_mean  =  14.7808194452
weighted_std  =  0.224336060918
