-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.263245539435
cusum  =  0.133894011472
eta  =  0.72824357191
hl_amp_ratio  =  0.445973174547
kurtosis  =  -0.689728222333
n_points  =  277
period  =  0.552949246085
period_SNR  =  37.427725078
period_log10FAP  =  -30.7178526276
period_uncertainty  =  0.000149324676295
phase_cusum  =  0.230849151207
phase_eta  =  0.584705386972
phi21  =  -2.30329414168
phi31  =  -1.23175136908
quartile31  =  0.31
r21  =  0.38089847605
r31  =  0.155834470148
shapiro_w  =  0.925843417645
skewness  =  -0.64332244555
slope_per10  =  -0.106338061033
slope_per90  =  0.175939249434
stetson_k  =  0.789502574624
weighted_mean  =  14.0327334451
weighted_std  =  0.213853745744
