-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.384205225178
cusum  =  0.154877289744
eta  =  0.556181611113
hl_amp_ratio  =  0.408503997296
kurtosis  =  -0.430542390573
n_points  =  239
period  =  0.53658006336
period_SNR  =  31.0716256369
period_log10FAP  =  -26.505109524
period_uncertainty  =  0.000103023375963
phase_cusum  =  0.328707002202
phase_eta  =  0.265788030365
phi21  =  -2.28283953458
phi31  =  -0.964298964703
quartile31  =  0.475
r21  =  0.58315978413
r31  =  0.292039076322
shapiro_w  =  0.942183732986
skewness  =  -0.605655927911
slope_per10  =  -0.144531562126
slope_per90  =  0.201087782195
stetson_k  =  0.759622904267
weighted_mean  =  12.7641787314
weighted_std  =  0.31283128871
