-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.435359201793
cusum  =  0.139915199551
eta  =  0.600531077089
hl_amp_ratio  =  0.227138358401
kurtosis  =  -0.216643809168
n_points  =  238
period  =  0.512186971449
period_SNR  =  35.4782139608
period_log10FAP  =  -28.5189441528
period_uncertainty  =  0.000134550000755
phase_cusum  =  0.220837688428
phase_eta  =  0.361560862851
phi21  =  -2.33645656374
phi31  =  -4.38925008015
quartile31  =  0.5175
r21  =  0.404872642799
r31  =  0.236594423887
shapiro_w  =  0.871398806572
skewness  =  -0.945827909366
slope_per10  =  -0.121465271097
slope_per90  =  0.21268752036
stetson_k  =  0.693812206431
weighted_mean  =  12.7142021868
weighted_std  =  0.374452735408
