-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.331028103876
cusum  =  0.135304207181
eta  =  0.583420412223
hl_amp_ratio  =  0.551910976859
kurtosis  =  -0.905111441548
n_points  =  256
period  =  0.576084828244
period_SNR  =  40.7918532929
period_log10FAP  =  -34.0191386191
period_uncertainty  =  0.000122155397402
phase_cusum  =  0.28004767439
phase_eta  =  0.16916850654
phi21  =  0.917609753784
phi31  =  2.2301565194
quartile31  =  0.44
r21  =  0.447682028509
r31  =  0.265809226685
shapiro_w  =  0.935221135616
skewness  =  -0.495102615333
slope_per10  =  -0.220503294349
slope_per90  =  0.236865263797
stetson_k  =  0.815309025111
weighted_mean  =  15.0873289599
weighted_std  =  0.26805874736
