-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.252334636306
cusum  =  0.150934907238
eta  =  0.619666985393
hl_amp_ratio  =  0.650508819837
kurtosis  =  -0.650507932608
n_points  =  122
period  =  0.581762549459
period_SNR  =  19.9243733871
period_log10FAP  =  -12.9497811757
period_uncertainty  =  0.000105003712305
phase_cusum  =  0.253408102825
phase_eta  =  0.319215542046
phi21  =  0.778798263171
phi31  =  -0.96011920945
quartile31  =  0.2575
r21  =  0.488005071345
r31  =  0.272966509374
shapiro_w  =  0.942892789841
skewness  =  -0.522032678696
slope_per10  =  -0.166704189363
slope_per90  =  0.268699997493
stetson_k  =  0.76183679043
weighted_mean  =  14.7254112286
weighted_std  =  0.218099835614
