-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.314012502465
cusum  =  0.133019799934
eta  =  0.664183988285
hl_amp_ratio  =  0.41387042876
kurtosis  =  -0.543460542854
n_points  =  247
period  =  0.539200556364
period_SNR  =  35.5735285416
period_log10FAP  =  -28.5515814099
period_uncertainty  =  0.000107012551787
phase_cusum  =  0.272333283151
phase_eta  =  0.255152276369
phi21  =  -2.13335404652
phi31  =  -4.11094703183
quartile31  =  0.4
r21  =  0.471214641781
r31  =  0.285564792155
shapiro_w  =  0.933163762093
skewness  =  -0.524662274175
slope_per10  =  -0.10873507178
slope_per90  =  0.210829636257
stetson_k  =  0.770581839304
weighted_mean  =  14.8498194893
weighted_std  =  0.262907226515
