<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_ESD
class_probability =  0.54


######### Lightcurve features #########

amplitude  =  1.02769591483
cusum  =  0.195894326756
eta  =  0.507355999903
hl_amp_ratio  =  1.30787632709
kurtosis  =  6.00843247303
n_points  =  106
period  =  1.99480125199
period_SNR  =  10.4694394187
period_log10FAP  =  -1.913597505
period_uncertainty  =  0.00132106080229
phase_cusum  =  0.200032196518
phase_eta  =  1.04786517046
phi21  =  -0.698064616497
phi31  =  -0.0632089770582
quartile31  =  0.255
r21  =  0.259254122267
r31  =  0.350248707387
shapiro_w  =  0.7296448946
skewness  =  1.55974146304
slope_per10  =  -0.4849000182
slope_per90  =  0.392031780178
stetson_k  =  0.530836712089
weighted_mean  =  9.36786315789
weighted_std  =  0.525362794157
</pre></body></html>