-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.349030558502
cusum  =  0.200038938981
eta  =  0.637141756625
hl_amp_ratio  =  0.442363209471
kurtosis  =  -0.972404485518
n_points  =  120
period  =  0.524094184603
period_SNR  =  16.7222126083
period_log10FAP  =  -11.0053942837
period_uncertainty  =  0.000118573350878
phase_cusum  =  0.284552729398
phase_eta  =  0.242698300186
phi21  =  -2.18523089684
phi31  =  -4.34550948948
quartile31  =  0.5525
r21  =  0.424821334218
r31  =  0.256962028679
shapiro_w  =  0.919916987419
skewness  =  -0.492213248893
slope_per10  =  -0.12405396255
slope_per90  =  0.429219068445
stetson_k  =  0.782193314244
weighted_mean  =  14.8658441881
weighted_std  =  0.322112471123
