<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.45


######### Lightcurve features #########

amplitude  =  0.39368546139
cusum  =  0.265950231762
eta  =  0.347585173446
hl_amp_ratio  =  0.514658853417
kurtosis  =  -0.37596821366
n_points  =  310
period  =  1.00002808849
period_SNR  =  15.5186190425
period_log10FAP  =  -12.4034469965
period_uncertainty  =  0.000217966027899
phase_cusum  =  0.168792133864
phase_eta  =  0.995120183823
phi21  =  2.95507533328
phi31  =  2.81811737796
quartile31  =  0.69
r21  =  0.217736650968
r31  =  0.208573169902
shapiro_w  =  0.939257264137
skewness  =  -0.599311411689
slope_per10  =  -0.0859500057995
slope_per90  =  0.155961001163
stetson_k  =  0.816248862413
weighted_mean  =  10.9478709677
weighted_std  =  0.424817967995
</pre></body></html>