-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.32


######### Lightcurve features #########

amplitude  =  0.50737749718
cusum  =  0.211497537111
eta  =  2.32505859159
hl_amp_ratio  =  1.17010561475
kurtosis  =  1.51618023128
n_points  =  24
period  =  0.101997064895
period_SNR  =  6.77502408377
period_log10FAP  =  0.0
period_uncertainty  =  3.6620434441e-06
phase_cusum  =  0.192409982121
phase_eta  =  1.3353072801
phi21  =  -0.840826095697
phi31  =  -1.34375236813
quartile31  =  0.4125
r21  =  0.175135744939
r31  =  0.363368999111
shapiro_w  =  0.959766030312
skewness  =  0.464577886895
slope_per10  =  -0.135222260089
slope_per90  =  0.0733933300855
stetson_k  =  0.72983156467
weighted_mean  =  10.6690744102
weighted_std  =  0.386864701864
