-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.66


######### Lightcurve features #########

amplitude  =  0.29854635849
cusum  =  0.130109963711
eta  =  0.627510031435
hl_amp_ratio  =  0.492154063338
kurtosis  =  -1.1621851439
n_points  =  132
period  =  0.662022745286
period_SNR  =  21.2602834648
period_log10FAP  =  -16.0980967235
period_uncertainty  =  0.000144483364373
phase_cusum  =  0.301645138706
phase_eta  =  0.164421031385
phi21  =  -1.97160535751
phi31  =  -3.75312005936
quartile31  =  0.45
r21  =  0.447857962474
r31  =  0.254128663107
shapiro_w  =  0.909329652786
skewness  =  -0.466864009012
slope_per10  =  -0.430856301863
slope_per90  =  0.541466928512
stetson_k  =  0.825750832817
weighted_mean  =  13.5149785867
weighted_std  =  0.259459555198
