-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.30996467509
cusum  =  0.125617902131
eta  =  0.580518925398
hl_amp_ratio  =  0.737495164658
kurtosis  =  -0.989946124323
n_points  =  270
period  =  0.596430217376
period_SNR  =  35.6415410733
period_log10FAP  =  -33.676058063
period_uncertainty  =  0.000129630567795
phase_cusum  =  0.278172262796
phase_eta  =  0.510164702316
phi21  =  1.14435150297
phi31  =  5.40881300892
quartile31  =  0.4075
r21  =  0.397974998522
r31  =  0.132024574128
shapiro_w  =  0.964754521847
skewness  =  -0.220451367545
slope_per10  =  -0.0738354235472
slope_per90  =  0.287333332623
stetson_k  =  0.833832121584
weighted_mean  =  11.4150618812
weighted_std  =  0.253908060332
