-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_EC
class_probability =  0.32


######### Lightcurve features #########

amplitude  =  0.570704497867
cusum  =  0.437871701352
eta  =  0.112485450421
hl_amp_ratio  =  10.6550480438
kurtosis  =  -1.06838092676
n_points  =  223
period  =  0.997337491997
period_SNR  =  32.8036453158
period_log10FAP  =  -31.320930033
period_uncertainty  =  0.000330280693688
phase_cusum  =  0.245659046954
phase_eta  =  0.260464165816
phi21  =  -2.25807092448
phi31  =  -0.517130911462
quartile31  =  0.825
r21  =  0.139537565959
r31  =  0.201887630327
shapiro_w  =  0.718253314495
skewness  =  0.878326036055
slope_per10  =  -0.255113834558
slope_per90  =  0.212107293483
stetson_k  =  0.611895993796
weighted_mean  =  10.519251497
weighted_std  =  0.412261954084
