-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.65


######### Lightcurve features #########

amplitude  =  0.262853747786
cusum  =  0.163039753558
eta  =  0.538362347463
hl_amp_ratio  =  0.805141616825
kurtosis  =  -1.31982688357
n_points  =  115
period  =  0.649908715133
period_SNR  =  19.6727350993
period_log10FAP  =  -13.1682293898
period_uncertainty  =  0.000182339132533
phase_cusum  =  0.304849387055
phase_eta  =  0.197826066223
phi21  =  -2.40564486016
phi31  =  -4.23474150705
quartile31  =  0.465
r21  =  0.531424948056
r31  =  0.311073741654
shapiro_w  =  0.93006169796
skewness  =  -0.138432243527
slope_per10  =  -0.218650619752
slope_per90  =  0.766341664518
stetson_k  =  0.895432008337
weighted_mean  =  13.6694492255
weighted_std  =  0.257865672887
