-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.248901321311
cusum  =  0.162002688768
eta  =  0.591604249978
hl_amp_ratio  =  0.392136848982
kurtosis  =  -1.18283151323
n_points  =  260
period  =  0.579739390426
period_SNR  =  38.6596249151
period_log10FAP  =  -35.7228047359
period_uncertainty  =  0.000164968182238
phase_cusum  =  0.279302725207
phase_eta  =  0.129822675698
phi21  =  1.42861588674
phi31  =  2.96924482664
quartile31  =  0.36
r21  =  0.466225176896
r31  =  0.285781985193
shapiro_w  =  0.916693747044
skewness  =  -0.386313425389
slope_per10  =  -0.131045496232
slope_per90  =  0.423063471531
stetson_k  =  0.781069798838
weighted_mean  =  14.2385904188
weighted_std  =  0.207755934261
