-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.221963613837
cusum  =  0.0769575620547
eta  =  0.701433958026
hl_amp_ratio  =  0.780747390533
kurtosis  =  -0.693549703376
n_points  =  269
period  =  0.545623322471
period_SNR  =  42.2124200774
period_log10FAP  =  -35.4062259707
period_uncertainty  =  0.00010667818235
phase_cusum  =  0.244762368947
phase_eta  =  0.242828032865
phi21  =  1.05310353982
phi31  =  2.42695196887
quartile31  =  0.31
r21  =  0.469582539975
r31  =  0.278051694439
shapiro_w  =  0.972259402275
skewness  =  -0.298571174924
slope_per10  =  -0.117366518606
slope_per90  =  0.249544000309
stetson_k  =  0.829237934663
weighted_mean  =  13.2107080989
weighted_std  =  0.200283439463
