-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.77


######### Lightcurve features #########

amplitude  =  0.47474794079
cusum  =  0.145961630143
eta  =  0.510157739608
hl_amp_ratio  =  0.307226389729
kurtosis  =  -1.07746917004
n_points  =  257
period  =  0.550311757583
period_SNR  =  38.6951407138
period_log10FAP  =  -35.4379537141
period_uncertainty  =  0.000137354744366
phase_cusum  =  0.247893830062
phase_eta  =  0.0719575576546
phi21  =  -2.403488937
phi31  =  -4.3724162725
quartile31  =  0.75
r21  =  0.428383894273
r31  =  0.334899930812
shapiro_w  =  0.884717464447
skewness  =  -0.585527430562
slope_per10  =  -0.152818601083
slope_per90  =  0.289975825967
stetson_k  =  0.770342828189
weighted_mean  =  12.1003689418
weighted_std  =  0.426299748401
