<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.42


######### Lightcurve features #########

amplitude  =  0.737096777818
cusum  =  0.325467084146
eta  =  0.250932141329
hl_amp_ratio  =  0.598844713339
kurtosis  =  -0.0236799181376
n_points  =  255
period  =  0.997327070718
period_SNR  =  24.1053523123
period_log10FAP  =  -21.7298481729
period_uncertainty  =  0.000220403783299
phase_cusum  =  0.169064643105
phase_eta  =  0.84245200532
phi21  =  1.92785027185
phi31  =  4.65695666915
quartile31  =  0.585
r21  =  0.754219376211
r31  =  0.403201985456
shapiro_w  =  0.932542443275
skewness  =  -0.753159694096
slope_per10  =  -0.0899487465929
slope_per90  =  0.0812297499947
stetson_k  =  0.812966536814
weighted_mean  =  11.2769019608
weighted_std  =  0.375182321948
</pre></body></html>