-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.308292244801
cusum  =  0.107632346899
eta  =  0.765710635753
hl_amp_ratio  =  0.326040348963
kurtosis  =  -0.470347609432
n_points  =  269
period  =  0.593752997517
period_SNR  =  36.9187934623
period_log10FAP  =  -31.1300764923
period_uncertainty  =  0.000126357314625
phase_cusum  =  0.25776515393
phase_eta  =  0.582544528507
phi21  =  0.951786923533
phi31  =  2.57803853901
quartile31  =  0.45
r21  =  0.376200953758
r31  =  0.234088740568
shapiro_w  =  0.93284624815
skewness  =  -0.446232014382
slope_per10  =  -0.125915049755
slope_per90  =  0.241136464734
stetson_k  =  0.748305324203
weighted_mean  =  12.3532500942
weighted_std  =  0.28180072347
