-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.322660861657
cusum  =  0.0938901357169
eta  =  0.513560344481
hl_amp_ratio  =  0.727641078034
kurtosis  =  -0.408879776908
n_points  =  348
period  =  0.636309001833
period_SNR  =  35.5221050636
period_log10FAP  =  -37.5162429888
period_uncertainty  =  0.000129620906139
phase_cusum  =  0.197716460047
phase_eta  =  0.217811091436
phi21  =  1.25222912892
phi31  =  2.28891707042
quartile31  =  0.4125
r21  =  0.532146525043
r31  =  0.315049782057
shapiro_w  =  0.938521504402
skewness  =  -0.649102195909
slope_per10  =  -0.092952444173
slope_per90  =  0.193499987945
stetson_k  =  0.801305435177
weighted_mean  =  15.0066075333
weighted_std  =  0.290799239317
