-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.7


######### Lightcurve features #########

amplitude  =  0.250444063635
cusum  =  0.186300670328
eta  =  0.885411307691
hl_amp_ratio  =  0.581679792162
kurtosis  =  -0.210718380908
n_points  =  46
period  =  0.688008844974
period_SNR  =  9.79687500268
period_log10FAP  =  -1.74615353159
period_uncertainty  =  0.000211008690791
phase_cusum  =  0.370934623288
phase_eta  =  0.262181346694
phi21  =  4.18914592179
phi31  =  5.56392484228
quartile31  =  0.27
r21  =  0.524882901773
r31  =  0.441724174094
shapiro_w  =  0.946700692177
skewness  =  -0.58702761437
slope_per10  =  -0.332039820189
slope_per90  =  0.761234326942
stetson_k  =  0.821080938027
weighted_mean  =  14.0323345289
weighted_std  =  0.1826967005
